ERRATUM

VOLUME 17

Page 489. The sentence on line 3–4 of the article Early history of the Generalized Continuum Hypothesis: 1878–1938 by Gregory H. Moore contains a word which became corrupted after proofreading was finished. It should read as follows:

However, the origins and early history of the Generalized Continuum Hypothesis have not.